<template>
  <path
    d="M19.94 21.1202C18.84 18.1802 18.3 15.0902 18.3 12.0002C18.3 8.91018 18.85 5.82018 19.94 2.88018C19.98 2.77018 20 2.66018 20 2.57018C20 2.23018 19.77 2.00018 19.37 2.00018H4.63C4.23 2.00018 4 2.23018 4 2.57018C4 2.67018 4.02 2.77018 4.06 2.88018C5.16 5.82018 5.71 8.91018 5.71 12.0002C5.71 15.0902 5.16 18.1802 4.07 21.1202C4.02 21.2302 4 21.3402 4 21.4302C4 21.7602 4.23 22.0002 4.63 22.0002H19.38C19.77 22.0002 20.01 21.7602 20.01 21.4302C20 21.3302 19.98 21.2302 19.94 21.1202ZM6.54 20.0002C7.31 17.4002 7.7 14.7202 7.7 12.0002C7.7 9.28018 7.31 6.60018 6.54 4.00018H17.45C16.68 6.60018 16.29 9.28018 16.29 12.0002C16.29 14.7202 16.68 17.4002 17.45 20.0002H6.54Z"
  />
</template>
