<template>
  <path
    d="M20 6.54018V17.4502C17.4 16.6802 14.72 16.2902 12 16.2902C9.28 16.2902 6.6 16.6802 4 17.4502V6.54018C6.6 7.31018 9.28 7.70018 12 7.70018C14.72 7.71018 17.4 7.32018 20 6.54018ZM21.43 4.00018C21.33 4.00018 21.23 4.02018 21.12 4.06018C18.18 5.16018 15.09 5.70018 12 5.70018C8.91 5.70018 5.82 5.15018 2.88 4.06018C2.77 4.02018 2.66 4.00018 2.57 4.00018C2.23 4.00018 2 4.23018 2 4.63018V19.3802C2 19.7702 2.23 20.0002 2.57 20.0002C2.67 20.0002 2.77 19.9802 2.88 19.9402C5.82 18.8402 8.91 18.3002 12 18.3002C15.09 18.3002 18.18 18.8502 21.12 19.9402C21.23 19.9802 21.33 20.0002 21.43 20.0002C21.76 20.0002 22 19.7702 22 19.3702V4.63018C22 4.23018 21.76 4.00018 21.43 4.00018Z"
  />
</template>
