<template>
  <path
    d="M14 9.61018V7.00018H16C17.1 7.00018 18 6.10018 18 5.00018C18 3.90018 17.1 3.00018 16 3.00018H13C12.45 3.00018 12 3.45018 12 4.00018V7.61018L14 9.61018ZM5.11998 3.56018C4.72998 3.17018 4.09998 3.17018 3.70998 3.56018C3.31998 3.95018 3.31998 4.58018 3.70998 4.97018L12 13.2702V13.5502C11.06 13.0102 9.89998 12.8002 8.66998 13.2302C7.32998 13.7102 6.29998 14.9002 6.05998 16.3002C5.59998 19.0402 7.91998 21.3802 10.65 20.9502C12.61 20.6402 14 18.8402 14 16.8502V15.2702L19.02 20.2902C19.41 20.6802 20.04 20.6802 20.43 20.2902C20.82 19.9002 20.82 19.2702 20.43 18.8802L5.11998 3.56018Z"
  />
</template>
