<template>
  <path
    d="M20.12 12.0402C20.62 11.9902 21 11.5602 21 11.0502C21 10.4602 20.49 9.9902 19.9 10.0502C18.4 10.2002 17 10.6602 15.74 11.3502L17.22 12.8302C18.12 12.4202 19.09 12.1402 20.12 12.0402ZM21 15.0902C21 14.4802 20.46 14.0002 19.86 14.0902C19.48 14.1502 19.11 14.2502 18.75 14.3702L20.37 15.9902C20.74 15.8402 21 15.5002 21 15.0902ZM13.97 4.1402C14.03 3.5502 13.57 3.0302 12.97 3.0302C12.47 3.0302 12.03 3.4002 11.98 3.9002C11.88 4.9302 11.6 5.9102 11.19 6.8102L12.67 8.2902C13.36 7.0302 13.82 5.6302 13.97 4.1402ZM9.93 4.1602C10.03 3.5602 9.54 3.0202 8.93 3.0202C8.52 3.0202 8.18 3.2802 8.03 3.6402L9.65 5.2602C9.78 4.9102 9.87 4.5402 9.93 4.1602ZM20.44 18.8802L5.12 3.5602C4.73 3.1702 4.1 3.1702 3.71 3.5602C3.32 3.9502 3.32 4.5802 3.71 4.9702L5.86 7.1202C5.27 7.5302 4.6 7.8202 3.87 7.9402C3.39 8.0402 3.03 8.4402 3.03 8.9402C3.03 9.5502 3.57 10.0302 4.17 9.9402C5.34 9.7502 6.4 9.2602 7.3 8.5702L8.73 10.0002C7.39 11.1002 5.73 11.8202 3.92 11.9902C3.42 12.0402 3.04 12.4702 3.04 12.9802C3.04 13.5702 3.55 14.0402 4.14 13.9802C6.42 13.7502 8.5 12.8302 10.15 11.4202L12.63 13.9002C11.23 15.5502 10.3 17.6202 10.07 19.9002C10.01 20.4902 10.47 21.0102 11.07 21.0102C11.57 21.0102 12.01 20.6402 12.06 20.1402C12.24 18.3202 12.96 16.6602 14.05 15.3202L15.48 16.7502C14.79 17.6502 14.3 18.7102 14.11 19.8802C14.01 20.4802 14.5 21.0202 15.11 21.0202C15.6 21.0202 16.01 20.6602 16.09 20.1702C16.21 19.4402 16.51 18.7702 16.91 18.1802L19.04 20.3102C19.43 20.7002 20.06 20.7002 20.45 20.3102C20.83 19.9002 20.83 19.2702 20.44 18.8802Z"
  />
</template>
