<template>
  <path
    d="M11.05 21.0002C11.55 21.0002 11.99 20.6302 12.04 20.1302C12.45 15.8602 15.85 12.4602 20.12 12.0502C20.62 12.0002 21 11.5702 21 11.0602C21 10.4702 20.49 10.0002 19.9 10.0602C14.71 10.5802 10.58 14.7102 10.06 19.8902C10 20.4802 10.46 21.0002 11.05 21.0002ZM18 21.0002H21V18.0002C19.34 18.0002 18 19.3402 18 21.0002ZM15.09 21.0002C15.58 21.0002 15.99 20.6402 16.07 20.1502C16.43 18.0702 18.07 16.4302 20.15 16.0702C20.64 15.9902 21 15.5802 21 15.0902C21 14.4802 20.46 14.0002 19.86 14.0902C16.9 14.5702 14.57 16.9002 14.09 19.8602C13.99 20.4602 14.48 21.0002 15.09 21.0002ZM12.97 3.0202C12.47 3.0202 12.03 3.3902 11.98 3.8902C11.57 8.1602 8.17002 11.5602 3.90002 11.9702C3.40002 12.0202 3.02002 12.4502 3.02002 12.9602C3.02002 13.5502 3.53002 14.0202 4.12002 13.9602C9.31002 13.4402 13.44 9.3102 13.96 4.1302C14.03 3.5502 13.57 3.0202 12.97 3.0202ZM6.03002 3.0202H3.03002V6.0202C4.69002 6.0202 6.03002 4.6802 6.03002 3.0202ZM8.94002 3.0202C8.45002 3.0202 8.04002 3.3802 7.96002 3.8702C7.60002 5.9502 5.96002 7.5902 3.88002 7.9502C3.39002 8.0402 3.03002 8.4402 3.03002 8.9402C3.03002 9.5502 3.57002 10.0302 4.17002 9.9402C7.13002 9.4602 9.46002 7.1302 9.94002 4.1702C10.03 3.5602 9.54002 3.0202 8.94002 3.0202Z"
  />
</template>
