<template>
  <path
    d="M19 3.00018H5C3.9 3.00018 3 3.90018 3 5.00018V19.0002C3 20.1002 3.9 21.0002 5 21.0002H19C20.1 21.0002 21 20.1002 21 19.0002V5.00018C21 3.90018 20.1 3.00018 19 3.00018ZM6.25 7.50018H7.5V6.25018C7.5 5.84018 7.84 5.50018 8.25 5.50018C8.66 5.50018 9 5.84018 9 6.25018V7.50018H10.25C10.66 7.50018 11 7.84018 11 8.25018C11 8.66018 10.66 9.00018 10.25 9.00018H9V10.2502C9 10.6602 8.66 11.0002 8.25 11.0002C7.84 11.0002 7.5 10.6602 7.5 10.2502V9.00018H6.25C5.84 9.00018 5.5 8.66018 5.5 8.25018C5.5 7.84018 5.84 7.50018 6.25 7.50018ZM18 19.0002H5L19 5.00018V18.0002C19 18.5502 18.55 19.0002 18 19.0002ZM17 16.2502C17 15.8402 16.66 15.5002 16.25 15.5002H12.75C12.34 15.5002 12 15.8402 12 16.2502C12 16.6602 12.34 17.0002 12.75 17.0002H16.25C16.66 17.0002 17 16.6602 17 16.2502Z"
  />
</template>
