<template>
  <path
    d="M18 15.0002V19.0002C18 19.5502 17.55 20.0002 17 20.0002H5C4.45 20.0002 4 19.5502 4 19.0002V7.00018C4 6.45018 4.45 6.00018 5 6.00018H8.02C8.57 6.00018 9.02 5.55018 9.02 5.00018C9.02 4.45018 8.57 4.00018 8.02 4.00018H4C2.9 4.00018 2 4.90018 2 6.00018V20.0002C2 21.1002 2.9 22.0002 4 22.0002H18C19.1 22.0002 20 21.1002 20 20.0002V15.0002C20 14.4502 19.55 14.0002 19 14.0002C18.45 14.0002 18 14.4502 18 15.0002ZM15.5 18.0002H6.52C6.1 18.0002 5.87 17.5202 6.13 17.1902L7.87 14.9602C8.07 14.7102 8.45 14.7002 8.65 14.9502L10.21 16.8302L12.56 13.8102C12.76 13.5502 13.16 13.5502 13.35 13.8202L15.9 17.2102C16.15 17.5302 15.91 18.0002 15.5 18.0002ZM19.3 8.89018C19.78 8.12018 20.05 7.22018 19.99 6.23018C19.86 4.08018 18.15 2.26018 16.02 2.03018C13.3 1.73018 11 3.84018 11 6.50018C11 8.99018 13.01 11.0002 15.49 11.0002C16.37 11.0002 17.19 10.7402 17.88 10.3002L20.29 12.7102C20.68 13.1002 21.32 13.1002 21.71 12.7102C22.1 12.3202 22.1 11.6802 21.71 11.2902L19.3 8.89018ZM15.5 9.00018C14.12 9.00018 13 7.88018 13 6.50018C13 5.12018 14.12 4.00018 15.5 4.00018C16.88 4.00018 18 5.12018 18 6.50018C18 7.88018 16.88 9.00018 15.5 9.00018Z"
  />
</template>
