<template>
  <path
    d="M2.52998 19.6502L3.86998 20.2102V11.1802L1.43998 17.0402C1.02998 18.0602 1.51998 19.2302 2.52998 19.6502ZM22.03 15.9502L17.07 3.98024C16.76 3.23024 16.03 2.77024 15.26 2.75024C15 2.75024 14.73 2.79024 14.47 2.90024L7.09998 5.95024C6.34998 6.26024 5.88998 6.98024 5.86998 7.75024C5.85998 8.02024 5.90998 8.29024 6.01998 8.55024L10.98 20.5202C11.29 21.2802 12.03 21.7402 12.81 21.7502C13.07 21.7502 13.33 21.7002 13.58 21.6002L20.94 18.5502C21.96 18.1302 22.45 16.9602 22.03 15.9502ZM7.87998 8.75024C7.32998 8.75024 6.87998 8.30024 6.87998 7.75024C6.87998 7.20024 7.32998 6.75024 7.87998 6.75024C8.42998 6.75024 8.87998 7.20024 8.87998 7.75024C8.87998 8.30024 8.42998 8.75024 7.87998 8.75024ZM5.87998 19.7502C5.87998 20.8502 6.77998 21.7502 7.87998 21.7502H9.32998L5.87998 13.4102V19.7502Z"
  />
</template>
