<template>
  <path
    d="M17.5 14.2502V13.0002H18.6L19.32 14.5902C19.43 14.8402 19.68 15.0002 19.95 15.0002C20.45 15.0002 20.78 14.4902 20.59 14.0402L20.1 12.9002C20.6 12.6002 21 12.1002 21 11.5002V10.5002C21 9.67018 20.33 9.00018 19.5 9.00018H17C16.45 9.00018 16 9.45018 16 10.0002V13.9002L17.04 14.9402C17.31 14.8302 17.5 14.5602 17.5 14.2502ZM17.5 10.5002H19.5V11.5002H17.5V10.5002ZM13 10.5002V10.9002L14.5 12.4002V10.5002C14.5 9.68018 13.82 9.00018 13 9.00018H11.1L12.6 10.5002H13ZM21.03 21.0302L3.03001 3.03018C2.74001 2.74018 2.27001 2.74018 1.98001 3.03018C1.69001 3.32018 1.69001 3.79018 1.98001 4.08018L6.96001 9.06018C6.69001 9.17018 6.50001 9.44018 6.50001 9.75018V11.0002H4.50001V9.75018C4.50001 9.34018 4.16001 9.00018 3.75001 9.00018C3.34001 9.00018 3.00001 9.34018 3.00001 9.75018V14.2502C3.00001 14.6602 3.34001 15.0002 3.75001 15.0002C4.16001 15.0002 4.50001 14.6602 4.50001 14.2502V12.5002H6.50001V14.2502C6.50001 14.6602 6.84001 15.0002 7.25001 15.0002C7.66001 15.0002 8.00001 14.6602 8.00001 14.2502V10.1002L9.50001 11.6002V14.5002C9.50001 14.7802 9.72001 15.0002 10 15.0002H12.5C12.62 15.0002 12.74 14.9902 12.86 14.9602L19.97 22.0702C20.26 22.3602 20.73 22.3602 21.02 22.0702C21.31 21.7902 21.31 21.3202 21.03 21.0302Z"
  />
</template>
