<template>
  <path
    d="M6 11.0002H2C1.45 11.0002 1 11.4502 1 12.0002C1 12.5502 1.45 13.0002 2 13.0002H6C6.55 13.0002 7 12.5502 7 12.0002C7 11.4502 6.55 11.0002 6 11.0002ZM8.47 7.06018L7.75 6.34018C7.36 5.95018 6.73 5.95018 6.34 6.34018C5.95 6.73018 5.95 7.36018 6.34 7.75018L7.05 8.46018C7.44 8.85018 8.07 8.85018 8.46 8.46018C8.85 8.08018 8.85 7.44018 8.47 7.06018ZM12 1.00018C11.44 1.00018 11 1.45018 11 2.00018V6.00018C11 6.55018 11.45 7.00018 12 7.00018C12.55 7.00018 13 6.55018 13 6.00018V2.00018C13 1.45018 12.55 1.00018 12 1.00018ZM17.66 6.35018C17.27 5.96018 16.64 5.96018 16.25 6.35018L15.54 7.06018C15.15 7.45018 15.15 8.08018 15.54 8.47018C15.93 8.86018 16.56 8.86018 16.95 8.47018L17.66 7.76018C18.04 7.37018 18.04 6.73018 17.66 6.35018ZM17 12.0002C17 12.5602 17.45 13.0002 18 13.0002H22C22.55 13.0002 23 12.5502 23 12.0002C23 11.4502 22.55 11.0002 22 11.0002H18C17.45 11.0002 17 11.4502 17 12.0002ZM12 9.00018C10.34 9.00018 9 10.3402 9 12.0002C9 13.6602 10.34 15.0002 12 15.0002C13.66 15.0002 15 13.6602 15 12.0002C15 10.3402 13.66 9.00018 12 9.00018ZM15.53 16.9402L16.24 17.6502C16.63 18.0402 17.26 18.0402 17.65 17.6502C18.04 17.2602 18.04 16.6302 17.65 16.2402L16.94 15.5302C16.55 15.1402 15.92 15.1402 15.53 15.5302C15.15 15.9202 15.15 16.5602 15.53 16.9402ZM6.34 17.6502C6.73 18.0402 7.36 18.0402 7.75 17.6502L8.46 16.9402C8.85 16.5502 8.85 15.9202 8.46 15.5302C8.07 15.1402 7.44 15.1402 7.05 15.5302L6.34 16.2402C5.96 16.6302 5.96 17.2702 6.34 17.6502ZM12 23.0002C12.56 23.0002 13 22.5502 13 22.0002V18.0002C13 17.4502 12.55 17.0002 12 17.0002C11.45 17.0002 11 17.4502 11 18.0002V22.0002C11 22.5502 11.45 23.0002 12 23.0002Z"
  />
</template>
