<template>
  <path
    d="M11 3.23016C11 2.59016 10.41 2.10016 9.79001 2.24016C8.67001 2.50016 7.61001 2.94016 6.67001 3.54016C6.14001 3.88016 6.06001 4.64016 6.51001 5.09016C6.83001 5.41016 7.34001 5.49016 7.72001 5.25016C8.49001 4.76016 9.34001 4.40016 10.26 4.20016C10.7 4.10016 11 3.69016 11 3.23016ZM17.33 3.55016C16.39 2.95016 15.33 2.51016 14.21 2.25016C13.59 2.11016 13 2.59016 13 3.23016C13 3.68016 13.3 4.10016 13.74 4.19016C14.65 4.39016 15.51 4.76016 16.27 5.24016C16.66 5.48016 17.16 5.41016 17.48 5.08016C17.94 4.64016 17.87 3.89016 17.33 3.55016ZM20.77 11.0002C21.41 11.0002 21.9 10.4102 21.76 9.79016C21.5 8.67016 21.06 7.61016 20.46 6.67016C20.12 6.14016 19.36 6.06016 18.91 6.51016C18.59 6.83016 18.51 7.34016 18.75 7.72016C19.24 8.49016 19.6 9.34016 19.8 10.2502C19.9 10.7002 20.31 11.0002 20.77 11.0002ZM5.10001 6.51016C4.64001 6.06016 3.89001 6.13016 3.55001 6.67016C2.95001 7.61016 2.51001 8.67016 2.25001 9.79016C2.11001 10.4102 2.59001 11.0002 3.23001 11.0002C3.68001 11.0002 4.10001 10.7002 4.19001 10.2602C4.39001 9.35016 4.76001 8.49016 5.24001 7.73016C5.50001 7.34016 5.42001 6.83016 5.10001 6.51016ZM3.23001 13.0002C2.59001 13.0002 2.10001 13.5902 2.24001 14.2102C2.50001 15.3302 2.94001 16.3802 3.54001 17.3302C3.88001 17.8702 4.64001 17.9402 5.09001 17.4902C5.41001 17.1702 5.49001 16.6602 5.24001 16.2802C4.75001 15.5202 4.39001 14.6702 4.19001 13.7502C4.10001 13.3002 3.69001 13.0002 3.23001 13.0002ZM15 12.0002C15 10.3402 13.66 9.00016 12 9.00016C10.34 9.00016 9.00001 10.3402 9.00001 12.0002C9.00001 13.6602 10.34 15.0002 12 15.0002C13.66 15.0002 15 13.6602 15 12.0002ZM18.9 17.4902C19.35 17.9402 20.11 17.8702 20.45 17.3402C21.05 16.4002 21.49 15.3402 21.75 14.2302C21.89 13.6102 21.4 13.0202 20.77 13.0202C20.32 13.0202 19.9 13.3202 19.81 13.7602C19.61 14.6702 19.24 15.5202 18.76 16.2902C18.5 16.6602 18.58 17.1702 18.9 17.4902ZM13 20.7702C13 21.4102 13.59 21.9002 14.21 21.7602C15.33 21.5002 16.38 21.0602 17.33 20.4602C17.87 20.1202 17.94 19.3602 17.49 18.9102C17.17 18.5902 16.66 18.5102 16.28 18.7602C15.52 19.2502 14.67 19.6102 13.75 19.8102C13.3 19.9002 13 20.3102 13 20.7702ZM6.67001 20.4502C7.62001 21.0502 8.67001 21.4902 9.79001 21.7502C10.41 21.8902 11 21.4002 11 20.7702C11 20.3202 10.7 19.9002 10.26 19.8102C9.35001 19.6102 8.49001 19.2402 7.73001 18.7602C7.34001 18.5202 6.84001 18.5902 6.52001 18.9202C6.06001 19.3602 6.13001 20.1102 6.67001 20.4502Z"
  />
</template>
