<template>
  <path
    d="M16.14 12.5002C16.14 13.5002 16.04 14.3502 15.84 15.0502C15.64 15.7502 15.36 16.3202 15.01 16.7502C14.65 17.1902 14.22 17.5002 13.71 17.7002C13.2 17.9002 12.64 18.0002 12.01 18.0002C11.39 18.0002 10.83 17.9002 10.32 17.7002C9.80998 17.5002 9.36999 17.1902 9.00999 16.7502C8.64999 16.3102 8.35999 15.7402 8.15999 15.0502C7.95999 14.3502 7.85999 13.5002 7.85999 12.5002V10.4602C7.85999 9.46018 7.95999 8.61018 8.15999 7.91018C8.35999 7.21018 8.63999 6.65018 8.99999 6.22018C9.35999 5.79018 9.79999 5.48018 10.31 5.29018C10.81 5.10018 11.38 5.00018 12 5.00018C12.63 5.00018 13.19 5.10018 13.7 5.29018C14.21 5.48018 14.65 5.79018 15.01 6.22018C15.37 6.65018 15.65 7.21018 15.85 7.91018C16.05 8.61018 16.15 9.45018 16.15 10.4602V12.5002H16.14ZM14.03 10.1402C14.03 9.50018 13.98 8.96018 13.9 8.52018C13.81 8.08018 13.68 7.73018 13.5 7.46018C13.33 7.19018 13.11 7.00018 12.86 6.88018C12.61 6.75018 12.32 6.69018 12 6.69018C11.68 6.69018 11.39 6.75018 11.14 6.87018C10.89 6.99018 10.67 7.18018 10.5 7.45018C10.33 7.72018 10.19 8.07018 10.1 8.51018C10.01 8.95018 9.96999 9.49018 9.96999 10.1302V12.8002C9.96999 13.4402 10.02 13.9802 10.11 14.4202C10.2 14.8702 10.34 15.2302 10.51 15.5102C10.68 15.7902 10.9 15.9902 11.15 16.1202C11.4 16.2502 11.69 16.3102 12.02 16.3102C12.35 16.3102 12.64 16.2502 12.89 16.1202C13.14 15.9902 13.35 15.7902 13.52 15.5102C13.69 15.2302 13.82 14.8702 13.91 14.4202C14 13.9702 14.04 13.4302 14.04 12.8002V10.1402H14.03Z"
  />
</template>
