<template>
  <path
    d="M16.05 16.2902L18.91 13.2202C19.29 12.8302 19.63 12.4302 19.95 12.0402C20.27 11.6502 20.54 11.2602 20.77 10.8702C21 10.4802 21.18 10.0902 21.31 9.70018C21.44 9.31018 21.5 8.91018 21.5 8.52018C21.5 7.99018 21.41 7.50018 21.23 7.06018C21.05 6.62018 20.79 6.25018 20.45 5.95018C20.11 5.64018 19.68 5.41018 19.19 5.24018C18.68 5.08018 18.11 5.00018 17.47 5.00018C16.78 5.00018 16.16 5.11018 15.62 5.32018C15.08 5.53018 14.62 5.83018 14.26 6.20018C13.89 6.57018 13.61 7.00018 13.42 7.50018C13.24 7.97018 13.15 8.47018 13.14 9.00018H15.28C15.29 8.69018 15.33 8.40018 15.41 8.13018C15.5 7.84018 15.64 7.59018 15.81 7.38018C15.99 7.17018 16.22 7.01018 16.49 6.89018C16.76 6.77018 17.09 6.71018 17.45 6.71018C17.76 6.71018 18.03 6.76018 18.26 6.86018C18.49 6.96018 18.69 7.11018 18.85 7.29018C19.01 7.47018 19.13 7.69018 19.22 7.94018C19.3 8.19018 19.35 8.46018 19.35 8.75018C19.35 8.97018 19.32 9.18018 19.27 9.40018C19.21 9.62018 19.12 9.85018 18.98 10.1002C18.84 10.3502 18.66 10.6302 18.42 10.9302C18.19 11.2302 17.9 11.5802 17.54 11.9602L13.37 16.5102V18.0002H22V16.2902H16.05ZM7 7.00018C6.45 7.00018 6 7.45018 6 8.00018V11.0002H3C2.45 11.0002 2 11.4502 2 12.0002C2 12.5502 2.45 13.0002 3 13.0002H6V16.0002C6 16.5502 6.45 17.0002 7 17.0002C7.55 17.0002 8 16.5502 8 16.0002V13.0002H11C11.55 13.0002 12 12.5502 12 12.0002C12 11.4502 11.55 11.0002 11 11.0002H8V8.00018C8 7.45018 7.55 7.00018 7 7.00018Z"
  />
</template>
