<template>
  <path
    d="M15.05 16.2902L17.91 13.2202C18.29 12.8302 18.63 12.4302 18.95 12.0402C19.27 11.6502 19.54 11.2602 19.77 10.8702C20 10.4802 20.18 10.0902 20.31 9.70018C20.44 9.31018 20.5 8.91018 20.5 8.52018C20.5 7.99018 20.41 7.50018 20.23 7.06018C20.05 6.62018 19.79 6.25018 19.45 5.95018C19.11 5.64018 18.68 5.41018 18.19 5.24018C17.68 5.08018 17.11 5.00018 16.47 5.00018C15.78 5.00018 15.16 5.11018 14.62 5.32018C14.08 5.53018 13.62 5.83018 13.26 6.20018C12.89 6.57018 12.61 7.00018 12.42 7.50018C12.24 7.97018 12.15 8.47018 12.14 9.00018H14.28C14.29 8.69018 14.33 8.40018 14.41 8.13018C14.5 7.84018 14.64 7.59018 14.81 7.38018C14.99 7.17018 15.22 7.01018 15.49 6.89018C15.76 6.77018 16.09 6.71018 16.45 6.71018C16.76 6.71018 17.03 6.76018 17.26 6.86018C17.49 6.96018 17.69 7.11018 17.85 7.29018C18.01 7.47018 18.13 7.69018 18.22 7.94018C18.3 8.19018 18.35 8.46018 18.35 8.75018C18.35 8.97018 18.32 9.18018 18.27 9.40018C18.21 9.62018 18.12 9.85018 17.98 10.1002C17.84 10.3502 17.66 10.6302 17.42 10.9302C17.19 11.2302 16.9 11.5802 16.54 11.9602L12.37 16.5102V18.0002H21V16.2902H15.05ZM2 12.0002C2 12.5502 2.45 13.0002 3 13.0002H9C9.55 13.0002 10 12.5502 10 12.0002C10 11.4502 9.55 11.0002 9 11.0002H3C2.45 11.0002 2 11.4502 2 12.0002Z"
  />
</template>
