<template>
  <path
    d="M20.71 5.63018L18.37 3.29018C17.98 2.90018 17.35 2.90018 16.96 3.29018L13.84 6.41018L12.61 5.20018C12.22 4.81018 11.59 4.82018 11.2 5.20018C10.81 5.59018 10.81 6.22018 11.2 6.61018L11.92 7.33018L3.15 16.1002C3.05 16.2002 3 16.3202 3 16.4602V20.5002C3 20.7802 3.22 21.0002 3.5 21.0002H7.54C7.67 21.0002 7.8 20.9502 7.89 20.8502L16.66 12.0802L17.38 12.8002C17.77 13.1902 18.4 13.1902 18.79 12.8002C19.18 12.4102 19.18 11.7802 18.79 11.3902L17.57 10.1702L20.69 7.05018C21.1 6.65018 21.1 6.02018 20.71 5.63018ZM6.92 19.0002L5 17.0802L13.06 9.02018L14.98 10.9402L6.92 19.0002Z"
  />
</template>
