<template>
  <path
    d="M20 15.3102L22.6 12.7102C22.99 12.3202 22.99 11.6902 22.6 11.3002L20 8.6902V5.0002C20 4.4502 19.55 4.0002 19 4.0002H15.31L12.71 1.4002C12.32 1.0102 11.69 1.0102 11.3 1.4002L8.68998 4.0002H4.99998C4.44998 4.0002 3.99998 4.4502 3.99998 5.0002V8.6902L1.39998 11.2902C1.00998 11.6802 1.00998 12.3102 1.39998 12.7002L3.99998 15.3002V19.0002C3.99998 19.5502 4.44998 20.0002 4.99998 20.0002H8.68998L11.29 22.6002C11.68 22.9902 12.31 22.9902 12.7 22.6002L15.3 20.0002H19C19.55 20.0002 20 19.5502 20 19.0002V15.3102ZM12 16.9002V7.1002C12 6.4902 12.55 5.9902 13.15 6.1102C15.91 6.6502 18 9.0802 18 12.0002C18 14.9202 15.91 17.3502 13.15 17.8902C12.55 18.0102 12 17.5102 12 16.9002Z"
  />
</template>
