<template>
  <path
    d="M22.6 11.2902L20 8.6902V5.0002C20 4.4502 19.55 4.0002 19 4.0002H15.31L12.71 1.4002C12.32 1.0102 11.69 1.0102 11.3 1.4002L8.69001 4.0002H5.00001C4.45001 4.0002 4.00001 4.4502 4.00001 5.0002V8.6902L1.40001 11.2902C1.01001 11.6802 1.01001 12.3102 1.40001 12.7002L4.00001 15.3002V19.0002C4.00001 19.5502 4.45001 20.0002 5.00001 20.0002H8.69001L11.29 22.6002C11.68 22.9902 12.31 22.9902 12.7 22.6002L15.3 20.0002H19C19.55 20.0002 20 19.5502 20 19.0002V15.3102L22.6 12.7102C22.99 12.3202 22.99 11.6802 22.6 11.2902ZM17.92 12.9802C17.58 15.1002 16.07 16.9202 14.04 17.6402C12.83 18.0702 11.63 18.0902 10.54 17.8202C10.13 17.7202 10.06 17.1702 10.41 16.9202C11.98 15.8402 13 14.0402 13 12.0002C13 9.9602 11.98 8.1602 10.42 7.0802C10.07 6.8402 10.13 6.2902 10.55 6.1802C11.64 5.9102 12.84 5.9302 14.05 6.3602C16.07 7.0802 17.59 8.9002 17.93 11.0202C17.98 11.3502 18 11.6802 18 12.0002C17.99 12.3202 17.97 12.6502 17.92 12.9802Z"
  />
</template>
