<template>
  <path
    d="M21.02 5.00018H19V2.98018C19 2.44018 18.56 2.00018 18.02 2.00018H17.99C17.44 2.00018 17 2.44018 17 2.98018V5.00018H14.99C14.45 5.00018 14.01 5.44018 14 5.98018V6.01018C14 6.56018 14.44 7.00018 14.99 7.00018H17V9.01018C17 9.55018 17.44 10.0002 17.99 9.99018H18.02C18.56 9.99018 19 9.55018 19 9.01018V7.00018H21.02C21.56 7.00018 22 6.56018 22 6.02018V5.98018C22 5.44018 21.56 5.00018 21.02 5.00018ZM16 9.01018V8.00018H14.99C14.46 8.00018 13.96 7.79018 13.58 7.42018C13.21 7.04018 13 6.54018 13 5.98018C13 5.62018 13.1 5.29018 13.27 5.00018H5C3.9 5.00018 3 5.90018 3 7.00018V19.0002C3 20.1002 3.9 21.0002 5 21.0002H17C18.1 21.0002 19 20.1002 19 19.0002V10.7202C18.7 10.8902 18.36 11.0002 17.98 11.0002C16.89 10.9902 16 10.1002 16 9.01018ZM15.96 19.0002H6C5.59 19.0002 5.35 18.5302 5.6 18.2002L7.58 15.5702C7.79 15.2902 8.2 15.3102 8.4 15.5902L10 18.0002L12.61 14.5202C12.81 14.2602 13.2 14.2502 13.4 14.5102L16.35 18.1902C16.61 18.5202 16.38 19.0002 15.96 19.0002Z"
  />
</template>
