<template>
  <path
    d="M24 19.0002V9.00016C24 8.45016 23.55 8.00016 23 8.00016H17C16.45 8.00016 16 8.45016 16 9.00016V12.6102L18 14.6102V10.0002H22V17.0002H20.39L23.32 19.9302C23.71 19.8002 24 19.4402 24 19.0002ZM21 6.00016C21.55 6.00016 22 5.55016 22 5.00016C22 4.45016 21.55 4.00016 21 4.00016H7.39L9.39 6.00016H21ZM1.36 2.21016C0.97 2.60016 0.97 3.23016 1.36 3.62016L2.47 4.73016C2.18 5.08016 2 5.52016 2 6.00016V17.0002H1.5C0.67 17.0002 0 17.6702 0 18.5002C0 19.3302 0.67 20.0002 1.5 20.0002H17.73L19.37 21.6402C19.76 22.0302 20.39 22.0302 20.78 21.6402C21.17 21.2502 21.17 20.6202 20.78 20.2302L2.77 2.21016C2.38 1.82016 1.75 1.82016 1.36 2.21016ZM4 17.0002V6.27016L14.73 17.0002H4Z"
  />
</template>
