<template>
  <path
    d="M15 7.29018V3.00018C15 2.45018 14.55 2.00018 14 2.00018H10C9.45 2.00018 9 2.45018 9 3.00018V7.29018C9 7.42018 9.05 7.55018 9.15 7.64018L11.65 10.1402C11.85 10.3402 12.16 10.3402 12.36 10.1402L14.86 7.64018C14.95 7.55018 15 7.43018 15 7.29018ZM7.29 9.00018H3C2.45 9.00018 2 9.45018 2 10.0002V14.0002C2 14.5502 2.45 15.0002 3 15.0002H7.29C7.42 15.0002 7.55 14.9502 7.64 14.8502L10.14 12.3502C10.34 12.1502 10.34 11.8402 10.14 11.6402L7.64 9.14018C7.55 9.05018 7.43 9.00018 7.29 9.00018ZM9 16.7102V21.0002C9 21.5502 9.45 22.0002 10 22.0002H14C14.55 22.0002 15 21.5502 15 21.0002V16.7102C15 16.5802 14.95 16.4502 14.85 16.3602L12.35 13.8602C12.15 13.6602 11.84 13.6602 11.64 13.8602L9.14 16.3602C9.05 16.4502 9 16.5702 9 16.7102ZM16.35 9.15018L13.85 11.6502C13.65 11.8502 13.65 12.1602 13.85 12.3602L16.35 14.8602C16.44 14.9502 16.57 15.0102 16.7 15.0102H21C21.55 15.0102 22 14.5602 22 14.0102V10.0102C22 9.46018 21.55 9.01018 21 9.01018H16.71C16.57 9.00018 16.45 9.05018 16.35 9.15018Z"
  />
</template>
