<template>
  <path
    d="M20 6.00024H12L10.59 4.59024C10.21 4.21024 9.7 4.00024 9.17 4.00024H4C2.9 4.00024 2.01 4.90024 2.01 6.00024L2 18.0002C2 19.1002 2.9 20.0002 4 20.0002H20C21.1 20.0002 22 19.1002 22 18.0002V8.00024C22 6.90024 21.1 6.00024 20 6.00024ZM7.12 15.2902L5.71 13.8802C5.32 13.4902 5.32 12.8602 5.71 12.4702C6.1 12.0802 6.73 12.0802 7.12 12.4702L7.83 13.1802L10.66 10.3502C11.05 9.96024 11.68 9.96024 12.07 10.3502C12.46 10.7402 12.46 11.3702 12.07 11.7602L8.53 15.3002C8.14 15.6802 7.51 15.6802 7.12 15.2902ZM17.41 13.0002L18.29 13.8802C18.68 14.2702 18.68 14.9002 18.29 15.2902C17.9 15.6802 17.27 15.6802 16.88 15.2902L16 14.4102L15.12 15.2902C14.73 15.6802 14.1 15.6802 13.71 15.2902C13.32 14.9002 13.32 14.2702 13.71 13.8802L14.59 13.0002L13.71 12.1202C13.32 11.7302 13.32 11.1002 13.71 10.7102C14.1 10.3202 14.73 10.3202 15.12 10.7102L16 11.5902L16.88 10.7102C17.27 10.3202 17.9 10.3202 18.29 10.7102C18.68 11.1002 18.68 11.7302 18.29 12.1202L17.41 13.0002Z"
  />
</template>
