<template>
  <path
    d="M17.75 16.0002H7.17001C5.08001 16.0002 3.22001 14.4702 3.02001 12.3902C2.79001 10.0102 4.66001 8.00024 7.00001 8.00024H19.36C20.67 8.00024 21.86 8.94024 21.99 10.2402C22.14 11.7402 20.97 13.0002 19.5 13.0002H9.00001C8.45001 13.0002 8.00001 12.5502 8.00001 12.0002C8.00001 11.4502 8.45001 11.0002 9.00001 11.0002H17.75C18.16 11.0002 18.5 10.6602 18.5 10.2502C18.5 9.84024 18.16 9.50024 17.75 9.50024H9.14001C7.83001 9.50024 6.64001 10.4402 6.51001 11.7402C6.36001 13.2402 7.53001 14.5002 9.00001 14.5002H19.33C21.42 14.5002 23.28 12.9702 23.48 10.8902C23.71 8.50024 21.84 6.50024 19.5 6.50024H7.23001C4.36001 6.50024 1.79001 8.60024 1.52001 11.4602C1.22001 14.7502 3.78001 17.5002 7.00001 17.5002H17.75C18.16 17.5002 18.5 17.1602 18.5 16.7502C18.5 16.3402 18.16 16.0002 17.75 16.0002Z"
  />
</template>
