<template>
  <path
    d="M14.59 7.52024C14.59 7.21024 14.54 6.93024 14.44 6.67024C14.35 6.40024 14.2 6.18024 14 5.99024C13.8 5.80024 13.55 5.66024 13.25 5.55024C12.95 5.45024 12.59 5.39024 12.19 5.39024C11.8 5.39024 11.45 5.43024 11.16 5.52024C10.87 5.61024 10.63 5.73024 10.44 5.88024C10.25 6.04024 10.1 6.22024 10 6.43024C9.9 6.64024 9.85 6.86024 9.85 7.09024C9.85 7.57024 10.1 7.97024 10.59 8.30024C10.97 8.55024 11.36 8.78024 12 9.00024H7.39C7.34 8.92024 7.28 8.83024 7.24 8.75024C6.98 8.27024 6.85 7.72024 6.85 7.08024C6.85 6.47024 6.98 5.92024 7.25 5.41024C7.51 4.91024 7.88 4.48024 8.36 4.12024C8.84 3.77024 9.41 3.49024 10.06 3.29024C10.72 3.10024 11.45 3.00024 12.24 3.00024C13.05 3.00024 13.78 3.11024 14.45 3.34024C15.11 3.56024 15.68 3.88024 16.14 4.28024C16.61 4.68024 16.97 5.16024 17.22 5.71024C17.47 6.26024 17.6 6.86024 17.6 7.52024H14.59ZM20 10.0002H4C3.45 10.0002 3 10.4502 3 11.0002C3 11.5502 3.45 12.0002 4 12.0002H12.62C12.8 12.0702 13.02 12.1402 13.17 12.2002C13.54 12.3702 13.83 12.5402 14.04 12.7102C14.25 12.8802 14.39 13.0702 14.47 13.2802C14.54 13.4802 14.58 13.7102 14.58 13.9702C14.58 14.2002 14.53 14.4202 14.44 14.6302C14.35 14.8302 14.21 15.0102 14.02 15.1602C13.83 15.3102 13.6 15.4202 13.31 15.5102C13.02 15.5902 12.68 15.6402 12.3 15.6402C11.87 15.6402 11.47 15.6002 11.12 15.5102C10.77 15.4202 10.46 15.2802 10.21 15.0902C9.96 14.9002 9.76 14.6502 9.62 14.3402C9.48 14.0302 9.37 13.5802 9.37 13.1302H6.4C6.4 13.6802 6.48 14.2602 6.64 14.7102C6.8 15.1602 7.01 15.5602 7.29 15.9202C7.57 16.2702 7.89 16.5802 8.27 16.8402C8.64 17.1002 9.05 17.3202 9.49 17.4902C9.93 17.6602 10.39 17.7902 10.87 17.8802C11.35 17.9602 11.83 18.0102 12.31 18.0102C13.11 18.0102 13.84 17.9202 14.49 17.7302C15.14 17.5402 15.7 17.2802 16.16 16.9402C16.62 16.6002 16.98 16.1702 17.23 15.6702C17.48 15.1702 17.61 14.6002 17.61 13.9602C17.61 13.3602 17.51 12.8202 17.3 12.3502C17.25 12.2402 17.19 12.1202 17.13 12.0202H20C20.55 12.0202 21 11.5702 21 11.0202V11.0002C21 10.4502 20.55 10.0002 20 10.0002Z"
  />
</template>
