<template>
  <path
    d="M19 3.00024H5C3.9 3.00024 3 3.90024 3 5.00024V19.0002C3 20.1002 3.9 21.0002 5 21.0002H19C20.1 21.0002 21 20.1002 21 19.0002V5.00024C21 3.90024 20.1 3.00024 19 3.00024ZM12 5.75024C12 5.34024 12.34 5.00024 12.75 5.00024C13.16 5.00024 13.5 5.34024 13.5 5.75024V8.00024L15.29 5.31024C15.42 5.12024 15.64 5.00024 15.88 5.00024C16.44 5.00024 16.78 5.63024 16.47 6.10024L15.2 8.00024L16.47 9.90024C16.78 10.3702 16.45 11.0002 15.88 11.0002C15.64 11.0002 15.42 10.8802 15.29 10.6902L13.5 8.00024V10.2502C13.5 10.6602 13.16 11.0002 12.75 11.0002C12.34 11.0002 12 10.6602 12 10.2502V5.75024ZM7 8.25024C7 7.70024 7.45 7.25024 8 7.25024H9.5V6.50024H7.75C7.34 6.50024 7 6.16024 7 5.75024C7 5.34024 7.34 5.00024 7.75 5.00024H10C10.55 5.00024 11 5.45024 11 6.00024V7.75024C11 8.30024 10.55 8.75024 10 8.75024H8.5V9.50024H10.25C10.66 9.50024 11 9.84024 11 10.2502C11 10.6602 10.66 11.0002 10.25 11.0002H8C7.45 11.0002 7 10.5502 7 10.0002V8.25024ZM18.74 13.2602L13.71 18.2902C13.32 18.6802 12.69 18.6802 12.3 18.2902L9 15.0002L6.51 17.4902C5.95 18.0502 5 17.6502 5 16.8702C5 16.6402 5.09 16.4102 5.26 16.2502L8.29 13.2202C8.68 12.8302 9.31 12.8302 9.7 13.2202L13 16.5002L17.49 12.0102C18.05 11.4502 19 11.8502 19 12.6302C19 12.8702 18.91 13.0902 18.74 13.2602Z"
  />
</template>
