<template>
  <path
    d="M12.5 6.90024C13.92 6.90024 14.63 7.44024 14.89 8.30024C15.02 8.73024 15.45 9.00024 15.9 9.00024H15.96C16.66 9.00024 17.18 8.29024 16.93 7.64024C16.49 6.49024 15.52 5.56024 14 5.19024V4.50024C14 3.67024 13.33 3.00024 12.5 3.00024C11.67 3.00024 11 3.67024 11 4.50024V5.16024C10.61 5.24024 10.25 5.37024 9.89998 5.52024L11.41 7.03024C11.73 6.95024 12.1 6.90024 12.5 6.90024ZM4.76998 4.62024C4.37998 5.01024 4.37998 5.64024 4.76998 6.03024L7.49998 8.77024C7.49998 10.8502 9.05998 11.9902 11.41 12.6802L14.92 16.1902C14.58 16.6802 13.87 17.1002 12.5 17.1002C10.85 17.1002 9.99998 16.5102 9.66998 15.6702C9.51998 15.2802 9.17998 15.0002 8.76998 15.0002H8.59998C7.87998 15.0002 7.35998 15.7402 7.64998 16.3902C8.23998 17.7202 9.53998 18.5102 11.01 18.8302V19.5002C11.01 20.3302 11.68 21.0002 12.51 21.0002C13.34 21.0002 14.01 20.3302 14.01 19.5002V18.8502C14.97 18.6702 15.84 18.3002 16.47 17.7302L17.98 19.2402C18.37 19.6302 19 19.6302 19.39 19.2402C19.78 18.8502 19.78 18.2202 19.39 17.8302L6.17998 4.62024C5.78998 4.23024 5.15998 4.23024 4.76998 4.62024Z"
  />
</template>
