<template>
  <path
    d="M12 2.00024C6.48 2.00024 2 6.48024 2 12.0002C2 17.5202 6.48 22.0002 12 22.0002C17.52 22.0002 22 17.5202 22 12.0002C22 6.48024 17.52 2.00024 12 2.00024ZM13.41 18.0902V18.6702C13.41 19.4002 12.81 20.0002 12.08 20.0002H12.07C11.34 20.0002 10.74 19.4002 10.74 18.6702V18.0702C9.41 17.7902 8.23 17.0602 7.73 15.8302C7.5 15.2802 7.93 14.6702 8.53 14.6702H8.77C9.14 14.6702 9.44 14.9202 9.58 15.2702C9.87 16.0202 10.63 16.5402 12.09 16.5402C14.05 16.5402 14.49 15.5602 14.49 14.9502C14.49 14.1202 14.05 13.3402 11.82 12.8102C9.34 12.2102 7.64 11.1902 7.64 9.14024C7.64 7.42024 9.03 6.30024 10.75 5.93024V5.33024C10.75 4.60024 11.35 4.00024 12.08 4.00024H12.09C12.82 4.00024 13.42 4.60024 13.42 5.33024V5.95024C14.8 6.29024 15.67 7.15024 16.05 8.21024C16.25 8.76024 15.83 9.34024 15.24 9.34024H14.98C14.61 9.34024 14.31 9.08024 14.21 8.72024C13.98 7.96024 13.35 7.47024 12.09 7.47024C10.59 7.47024 9.69 8.15024 9.69 9.11024C9.69 9.95024 10.34 10.5002 12.36 11.0202C14.38 11.5402 16.54 12.4102 16.54 14.9302C16.52 16.7602 15.15 17.7602 13.41 18.0902Z"
  />
</template>
