<template>
  <path
    d="M18.5 8.00024C19.33 8.00024 20 7.33024 20 6.50024C20 5.67024 19.33 5.00024 18.5 5.00024H6.39001L9.39001 8.00024H11.22L10.67 9.28024L12.76 11.3702L14.21 8.00024H18.5ZM17.44 18.8802L4.12001 5.56024C3.73001 5.17024 3.10001 5.17024 2.71001 5.56024C2.32001 5.95024 2.32001 6.58024 2.71001 6.97024L8.97001 13.2302L7.32001 17.0702C6.93001 17.9902 7.60001 19.0002 8.59001 19.0002C9.14001 19.0002 9.64001 18.6702 9.86001 18.1602L11.07 15.3302L16.02 20.2802C16.41 20.6702 17.04 20.6702 17.43 20.2802C17.83 19.9002 17.83 19.2702 17.44 18.8802Z"
  />
</template>
