<template>
  <path
    d="M11.8 10.9002C9.53 10.3102 8.8 9.70024 8.8 8.75024C8.8 7.66024 9.81 6.90024 11.5 6.90024C12.92 6.90024 13.63 7.44024 13.89 8.30024C14.01 8.70024 14.34 9.00024 14.76 9.00024H15.06C15.72 9.00024 16.19 8.35024 15.96 7.73024C15.54 6.55024 14.56 5.57024 13 5.19024V4.50024C13 3.67024 12.33 3.00024 11.5 3.00024C10.67 3.00024 10 3.67024 10 4.50024V5.16024C8.06 5.58024 6.5 6.84024 6.5 8.77024C6.5 11.0802 8.41 12.2302 11.2 12.9002C13.7 13.5002 14.2 14.3802 14.2 15.3102C14.2 16.0002 13.71 17.1002 11.5 17.1002C9.85 17.1002 9 16.5102 8.67 15.6702C8.52 15.2802 8.18 15.0002 7.77 15.0002H7.49C6.82 15.0002 6.35 15.6802 6.6 16.3002C7.17 17.6902 8.5 18.5102 10 18.8302V19.5002C10 20.3302 10.67 21.0002 11.5 21.0002C12.33 21.0002 13 20.3302 13 19.5002V18.8502C14.95 18.4802 16.5 17.3502 16.5 15.3002C16.5 12.4602 14.07 11.4902 11.8 10.9002Z"
  />
</template>
