<template>
  <path
    d="M22.3 13.7702L20.44 11.9002C20.05 11.5102 19.42 11.5102 19.03 11.9002C18.64 12.2902 18.64 12.9202 19.03 13.3102L20.54 14.8302L14.88 20.4902L3.56001 9.17024L9.22001 3.51024L10.62 4.91024C11.01 5.30024 11.64 5.30024 12.03 4.91024C12.42 4.52024 12.42 3.89024 12.03 3.50024L10.28 1.75024C9.69001 1.16024 8.74001 1.16024 8.16001 1.75024L1.80001 8.11024C1.21001 8.70024 1.21001 9.65024 1.80001 10.2302L13.82 22.2502C14.41 22.8402 15.36 22.8402 15.94 22.2502L22.3 15.8902C22.89 15.3002 22.89 14.3502 22.3 13.7702ZM15.05 10.0002H20.05C20.6 10.0002 21.05 9.55024 21.05 9.00024V5.00024C21.05 4.45024 20.6 4.00024 20.05 4.00024V3.50024C20.05 2.12024 18.93 1.00024 17.55 1.00024C16.17 1.00024 15.05 2.12024 15.05 3.50024V4.00024C14.5 4.00024 14.05 4.45024 14.05 5.00024V9.00024C14.05 9.55024 14.5 10.0002 15.05 10.0002ZM15.85 3.50024C15.85 2.56024 16.61 1.80024 17.55 1.80024C18.49 1.80024 19.25 2.56024 19.25 3.50024V4.00024H15.85V3.50024ZM8.85001 20.1502L7.52001 21.4802C4.43001 20.0202 2.18001 17.1102 1.63001 13.6202C1.57001 13.2102 1.19001 12.9302 0.770013 13.0002C0.360013 13.0602 0.0800133 13.4502 0.150013 13.8602C0.750013 17.6702 3.11001 20.8702 6.39001 22.6102C7.96001 23.4402 9.94001 24.0402 12.19 23.9902C12.37 23.9902 12.45 23.7702 12.33 23.6402L8.85001 20.1502Z"
  />
</template>
