<template>
  <path
    d="M17 16.4402L3.60997 3.05024C3.21997 2.66024 2.58997 2.66024 2.19997 3.05024C1.80997 3.44024 1.80997 4.07024 2.19997 4.46024L4.99997 7.27024V21.0002C4.99997 22.1002 5.89997 23.0002 6.99997 23.0002H17C18.02 23.0002 18.85 22.2302 18.98 21.2502L20 22.2702C20.39 22.6602 21.02 22.6602 21.41 22.2702C21.8 21.8802 21.8 21.2502 21.41 20.8602L19 18.4402L17 16.4402ZM6.99997 19.0002V9.27024L16.73 19.0002H6.99997ZM17 5.00024V13.6102L19 15.6102V3.00024C19 1.90024 18.1 1.00024 17 1.00024H6.99997C6.28997 1.00024 5.66997 1.37024 5.31997 1.93024L8.38997 5.00024H17Z"
  />
</template>
