<template>
  <path
    d="M22 13.0002C22.55 13.0002 23 12.5502 23 12.0002C23 11.4502 22.55 11.0002 22 11.0002H20.94C20.48 6.83024 17.17 3.52024 13 3.06024V2.00024C13 1.45024 12.55 1.00024 12 1.00024C11.45 1.00024 11 1.45024 11 2.00024V3.06024C10.02 3.17024 9.09 3.44024 8.23 3.84024L9.76 5.37024C10.46 5.13024 11.22 5.00024 12 5.00024C15.87 5.00024 19 8.13024 19 12.0002C19 12.7902 18.87 13.5402 18.63 14.2402L20.16 15.7702C20.56 14.9102 20.83 13.9802 20.94 13.0002H22ZM20.44 18.8802L5.12 3.56024C4.73 3.17024 4.1 3.17024 3.71 3.56024C3.32 3.95024 3.32 4.58024 3.71 4.97024L5.04 6.30024C3.97 7.62024 3.26 9.23024 3.06 11.0002H2C1.45 11.0002 1 11.4502 1 12.0002C1 12.5502 1.45 13.0002 2 13.0002H3.06C3.52 17.1702 6.83 20.4802 11 20.9402V22.0002C11 22.5502 11.45 23.0002 12 23.0002C12.55 23.0002 13 22.5502 13 22.0002V20.9402C14.77 20.7402 16.38 20.0302 17.69 18.9602L19.02 20.2902C19.41 20.6802 20.04 20.6802 20.43 20.2902C20.83 19.9002 20.83 19.2702 20.44 18.8802ZM12 19.0002C8.13 19.0002 5 15.8702 5 12.0002C5 10.3902 5.55 8.91024 6.46 7.73024L16.27 17.5402C15.09 18.4502 13.61 19.0002 12 19.0002Z"
  />
</template>
