<template>
  <path
    d="M6.99997 5.00024H17V6.00024C17 6.55024 17.45 7.00024 18 7.00024C18.55 7.00024 19 6.55024 19 6.00024V3.00024C19 1.90024 18.1 1.01024 17 1.01024L6.99997 1.00024C5.89997 1.00024 4.99997 1.90024 4.99997 3.00024V6.00024C4.99997 6.55024 5.44997 7.00024 5.99997 7.00024C6.54997 7.00024 6.99997 6.55024 6.99997 6.00024V5.00024ZM16.12 15.8802L19.29 12.7102C19.68 12.3202 19.68 11.6902 19.29 11.3002L16.12 8.13024C15.73 7.74024 15.09 7.74024 14.7 8.13024C14.31 8.52024 14.31 9.15024 14.7 9.54024L17.17 12.0002L14.7 14.4702C14.31 14.8602 14.31 15.4902 14.7 15.8802C15.09 16.2702 15.73 16.2702 16.12 15.8802ZM9.28997 14.4602L6.82997 12.0002L9.28997 9.54024C9.67997 9.15024 9.67997 8.52024 9.28997 8.13024C8.89997 7.74024 8.25997 7.74024 7.86997 8.13024L4.69997 11.3002C4.30997 11.6902 4.30997 12.3202 4.69997 12.7102L7.86997 15.8802C8.25997 16.2702 8.89997 16.2702 9.28997 15.8802C9.68997 15.4902 9.67997 14.8502 9.28997 14.4602ZM17 19.0002H6.99997V18.0002C6.99997 17.4502 6.54997 17.0002 5.99997 17.0002C5.44997 17.0002 4.99997 17.4502 4.99997 18.0002V21.0002C4.99997 22.1002 5.89997 23.0002 6.99997 23.0002H17C18.1 23.0002 19 22.1002 19 21.0002V18.0002C19 17.4502 18.55 17.0002 18 17.0002C17.45 17.0002 17 17.4502 17 18.0002V19.0002Z"
  />
</template>
