<template>
  <path
    d="M15.98 10.2803L14.6 11.6603C14.4 11.8603 14.4 12.1703 14.6 12.3703L15.98 13.7503C16.26 14.0303 16.73 13.9003 16.83 13.5203C16.94 13.0203 17 12.5203 17 12.0003C17 11.4903 16.94 10.9903 16.82 10.5203C16.73 10.1403 16.26 10.0003 15.98 10.2803ZM20.1 7.7803C19.85 7.2303 19.12 7.1103 18.7 7.5403C18.44 7.8003 18.39 8.1803 18.53 8.5203C18.99 9.5903 19.25 10.7603 19.25 11.9903C19.25 13.2303 18.99 14.4103 18.52 15.4803C18.38 15.8003 18.43 16.1703 18.68 16.4203C19.09 16.8303 19.78 16.7103 20.03 16.1903C20.66 14.8903 21.01 13.4303 21.01 11.8903C21 10.4403 20.68 9.0403 20.1 7.7803ZM11.41 12.0003L15 8.4203C15.39 8.0303 15.39 7.4003 15 7.0003L10.71 2.7103C10.08 2.0803 8.99997 2.5203 8.99997 3.4103V9.5903L5.10997 5.7003C4.71997 5.3103 4.08997 5.3103 3.69997 5.7003C3.30997 6.0903 3.30997 6.7203 3.69997 7.1103L8.58997 12.0003L3.69997 16.8903C3.30997 17.2803 3.30997 17.9103 3.69997 18.3003C4.08997 18.6903 4.71997 18.6903 5.10997 18.3003L8.99997 14.4103V20.5903C8.99997 21.4803 10.08 21.9303 10.71 21.3003L15 17.0003C15.39 16.6103 15.39 15.9803 15 15.5803L11.41 12.0003ZM11 5.8303L12.88 7.7103L11 9.5903V5.8303ZM11 18.1703V14.4103L12.88 16.2903L11 18.1703Z"
  />
</template>
