<template>
  <path
    d="M15.67 4.00024H14V3.00024C14 2.45024 13.55 2.00024 13 2.00024H11C10.45 2.00024 10 2.45024 10 3.00024V4.00024H8.33C7.6 4.00024 7 4.60024 7 5.33024V20.6602C7 21.4002 7.6 22.0002 8.34 22.0002H15.66C16.4 22.0002 17 21.4002 17 20.6702V5.33024C17 4.60024 16.4 4.00024 15.67 4.00024ZM13 18.0002H11V16.0002H13V18.0002ZM14.3 12.6902C14.3 12.6902 13.92 13.1102 13.63 13.4002C13.49 13.5402 13.36 13.7102 13.24 13.8702L13.15 14.0202C13.07 14.1402 13.01 14.2702 12.96 14.3902C12.87 14.6102 12.8 14.8202 12.8 15.0002H11.2C11.2 14.5802 11.32 14.2002 11.49 13.8702C11.55 13.7602 11.62 13.6602 11.69 13.5602C11.72 13.5102 11.75 13.4502 11.79 13.4002C11.9 13.2602 12.02 13.1202 12.13 13.0002L13.06 12.0602C13.33 11.7902 13.5 11.4102 13.5 11.0002C13.5 10.1702 12.83 9.50024 12 9.50024C11.35 9.50024 10.79 9.91024 10.59 10.4902C10.48 10.8002 10.2 11.0002 9.88 11.0002C9.36 11.0002 9 10.4802 9.17 9.99024C9.59 8.83024 10.69 8.00024 12 8.00024C13.66 8.00024 15 9.34024 15 11.0002C15 11.6602 14.73 12.2602 14.3 12.6902Z"
  />
</template>
