<template>
  <path
    d="M22 14.6002C22 15.3002 21.33 15.8002 20.66 15.6102L17.51 14.6802L10.5 7.67024V3.50024C10.5 2.67024 11.17 2.00024 12 2.00024C12.83 2.00024 13.5 2.67024 13.5 3.50024V9.00024L21.48 13.7002C21.8 13.8802 22 14.2302 22 14.6002ZM13.5 13.5002L9.56 9.56024L3.51 3.51024C3.12 3.12024 2.49 3.12024 2.1 3.51024C1.71 3.90024 1.71 4.53024 2.1 4.92024L7.77 10.5902L2.52 13.7002C2.2 13.8802 2 14.2302 2 14.6002C2 15.3002 2.67 15.8002 3.34 15.6102L10.5 13.5102V19.0002L8.24 20.3502C8.08999 20.4402 8 20.6102 8 20.7802V21.2802V21.3602C8 21.6902 8.31 21.9302 8.62 21.8502L11.54 21.1202L12 21.0002L12.38 21.0902L12.8 21.2002L14.7 21.6802L15.37 21.8502C15.69 21.9302 15.99 21.6902 15.99 21.3602V20.9902V20.7802C15.99 20.6002 15.9 20.4402 15.75 20.3502L13.5 19.0002V16.3302L19.07 21.9002C19.46 22.2902 20.09 22.2902 20.48 21.9002C20.87 21.5102 20.87 20.8802 20.48 20.4902L13.5 13.5002Z"
  />
</template>
