<template>
  <path
    d="M21.48 13.7002L13.5 9.00024V3.50024C13.5 2.67024 12.83 2.00024 12 2.00024C11.17 2.00024 10.5 2.67024 10.5 3.50024V9.00024L2.52 13.7002C2.2 13.8802 2 14.2302 2 14.6002C2 15.3002 2.67 15.8002 3.34 15.6102L10.5 13.5102V19.0002L8.24 20.3502C8.09 20.4402 8 20.6102 8 20.7802V21.2802V21.3602C8 21.6902 8.31 21.9302 8.62 21.8502L11.54 21.1202L12 21.0002L12.38 21.0902L12.8 21.2002L14.7 21.6802L15.37 21.8502C15.69 21.9302 15.99 21.6902 15.99 21.3602V20.9902V20.7802C15.99 20.6002 15.9 20.4402 15.75 20.3502L13.5 19.0002V13.5002L20.66 15.6002C21.33 15.8002 22 15.3002 22 14.6002C22 14.2302 21.8 13.8802 21.48 13.7002Z"
  />
</template>
