<template>
  <path
    d="M15.87 15.2501L12.5 13.2501V8.72014C12.5 8.32014 12.18 8.00014 11.78 8.00014H11.72C11.32 8.00014 11 8.32014 11 8.72014V13.4401C11 13.7901 11.18 14.1201 11.49 14.3001L15.14 16.4901C15.48 16.6901 15.92 16.5901 16.12 16.2501C16.33 15.9001 16.22 15.4501 15.87 15.2501ZM21.18 5.01014L18.1 2.45014C17.68 2.10014 17.05 2.15014 16.69 2.58014C16.34 3.00014 16.4 3.63014 16.82 3.99014L19.89 6.55014C20.31 6.90014 20.94 6.85014 21.3 6.42014C21.66 6.00014 21.6 5.37014 21.18 5.01014ZM4.10001 6.55014L7.17001 3.99014C7.60001 3.63014 7.66001 3.00014 7.30001 2.58014C6.95001 2.15014 6.32001 2.10014 5.90001 2.45014L2.82001 5.01014C2.40001 5.37014 2.34001 6.00014 2.70001 6.42014C3.05001 6.85014 3.68001 6.90014 4.10001 6.55014ZM12 4.00014C7.03001 4.00014 3.00001 8.03014 3.00001 13.0001C3.00001 17.9701 7.03001 22.0001 12 22.0001C16.97 22.0001 21 17.9701 21 13.0001C21 8.03014 16.97 4.00014 12 4.00014ZM12 20.0001C8.14001 20.0001 5.00001 16.8601 5.00001 13.0001C5.00001 9.14014 8.14001 6.00014 12 6.00014C15.86 6.00014 19 9.14014 19 13.0001C19 16.8601 15.86 20.0001 12 20.0001Z"
  />
</template>
