<template>
  <path
    d="M17.66 17.6602L16.95 18.3702C16.75 18.5702 16.44 18.5702 16.24 18.3702C16.04 18.1702 16.04 17.8602 16.24 17.6602L16.95 16.9502L15.01 15.0102L14.3 15.7202C14.1 15.9202 13.79 15.9202 13.59 15.7202C13.39 15.5202 13.39 15.2102 13.59 15.0102L14.3 14.3002L12.36 12.3602L11.65 13.0702C11.45 13.2702 11.14 13.2702 10.94 13.0702C10.74 12.8702 10.74 12.5602 10.94 12.3602L11.65 11.6502L9.7 9.70018L8.99 10.4102C8.79 10.6102 8.48 10.6102 8.28 10.4102C8.08 10.2102 8.08 9.90018 8.28 9.70018L8.99 8.99018L7.05 7.05018L6.34 7.76019C6.14 7.96019 5.83 7.96019 5.63 7.76019C5.43 7.56018 5.43 7.25019 5.63 7.05018L6.34 6.34019L4.85 4.85018C4.54 4.54018 4 4.76018 4 5.21018V18.0002C4 19.1002 4.9 20.0002 6 20.0002H18.79C19.24 20.0002 19.46 19.4602 19.14 19.1502L17.66 17.6602ZM7 16.0002V11.2402L12.76 17.0002H8C7.45 17.0002 7 16.5502 7 16.0002Z"
  />
</template>
