<template>
  <path
    d="M3.72001 6.04018C4.19001 6.50018 4.93001 6.52018 5.43001 6.10018C5.80001 5.78018 6.12001 5.59018 6.30001 5.67018C6.80001 5.87018 6.30001 6.70018 6.00001 7.19018C5.75001 7.61018 3.14001 11.0802 3.14001 13.5002C3.14001 14.7802 3.62001 15.8402 4.48001 16.4802C5.23001 17.0402 6.22001 17.2102 7.12001 16.9402C8.19001 16.6302 9.07001 15.5402 10.18 14.1702C11.39 12.6802 13.01 10.7302 14.26 10.7302C15.89 10.7302 15.91 11.7402 16.02 12.5202C12.24 13.1602 10.64 16.1902 10.64 17.8902C10.64 19.5902 12.08 20.9802 13.85 20.9802C15.48 20.9802 18.14 19.6502 18.54 14.8802H19.75C20.44 14.8802 21 14.3202 21 13.6302C21 12.9402 20.44 12.3802 19.75 12.3802H18.53C18.38 10.7302 17.44 8.18018 14.5 8.18018C12.25 8.18018 10.32 10.0902 9.56001 11.0202C8.98001 11.7502 7.50001 13.5002 7.27001 13.7402C7.02001 14.0402 6.59001 14.5802 6.16001 14.5802C5.71001 14.5802 5.44001 13.7502 5.80001 12.6602C6.15001 11.5702 7.20002 9.80018 7.65001 9.14018C8.43001 8.00018 8.95001 7.22018 8.95001 5.86018C8.95001 3.69018 7.31001 3.00018 6.44001 3.00018C5.35001 3.00018 4.40001 3.63018 3.74001 4.22018C3.21001 4.70018 3.21001 5.54018 3.72001 6.04018ZM13.88 18.5502C13.57 18.5502 13.14 18.2902 13.14 17.8302C13.14 17.2302 13.87 15.6302 16.01 15.0702C15.71 17.7602 14.58 18.5502 13.88 18.5502Z"
  />
</template>
