<template>
  <path
    d="M9.93 13.5002H14.07L12 7.98018L9.93 13.5002ZM20 2.00018H4C2.9 2.00018 2 2.90018 2 4.00018V20.0002C2 21.1002 2.9 22.0002 4 22.0002H20C21.1 22.0002 22 21.1002 22 20.0002V4.00018C22 2.90018 21.1 2.00018 20 2.00018ZM15.71 17.8802L14.81 15.5002H9.17L8.28 17.8702C8.14 18.2502 7.78 18.5002 7.37 18.5002C6.69 18.5002 6.22 17.8102 6.47 17.1802L10.72 6.37018C10.94 5.84018 11.44 5.50018 12 5.50018C12.56 5.50018 13.06 5.84018 13.27 6.37018L17.52 17.1802C17.77 17.8102 17.3 18.5002 16.62 18.5002C16.22 18.5002 15.86 18.2502 15.71 17.8802Z"
  />
</template>
