<template>
  <path
    d="M19 3.00018H5C3.9 3.00018 3 3.90018 3 5.00018V19.0002C3 20.1002 3.9 21.0002 5 21.0002H19C20.1 21.0002 21 20.1002 21 19.0002V5.00018C21 3.90018 20.1 3.00018 19 3.00018ZM13.56 6.53018C13.85 6.24018 14.33 6.24018 14.62 6.53018L15.5 7.41018L16.38 6.53018C16.67 6.24018 17.15 6.24018 17.44 6.53018C17.73 6.82018 17.73 7.30018 17.44 7.59018L16.56 8.47018L17.44 9.35018C17.73 9.64018 17.73 10.1202 17.44 10.4102C17.15 10.7002 16.67 10.7002 16.38 10.4102L15.5 9.54018L14.62 10.4202C14.33 10.7102 13.85 10.7102 13.56 10.4202C13.27 10.1302 13.27 9.65018 13.56 9.36018L14.44 8.48018L13.56 7.60018C13.26 7.30018 13.26 6.82018 13.56 6.53018ZM7 7.72018H10.5C10.91 7.72018 11.25 8.06018 11.25 8.47018C11.25 8.88018 10.91 9.22018 10.5 9.22018H7C6.59 9.22018 6.25 8.88018 6.25 8.47018C6.25 8.06018 6.59 7.72018 7 7.72018ZM10.75 16.0002H9.5V17.2502C9.5 17.6602 9.16 18.0002 8.75 18.0002C8.34 18.0002 8 17.6602 8 17.2502V16.0002H6.75C6.34 16.0002 6 15.6602 6 15.2502C6 14.8402 6.34 14.5002 6.75 14.5002H8V13.2502C8 12.8402 8.34 12.5002 8.75 12.5002C9.16 12.5002 9.5 12.8402 9.5 13.2502V14.5002H10.75C11.16 14.5002 11.5 14.8402 11.5 15.2502C11.5 15.6602 11.16 16.0002 10.75 16.0002ZM17.25 17.2502H13.75C13.34 17.2502 13 16.9102 13 16.5002C13 16.0902 13.34 15.7502 13.75 15.7502H17.25C17.66 15.7502 18 16.0902 18 16.5002C18 16.9102 17.66 17.2502 17.25 17.2502ZM17.25 14.7502H13.75C13.34 14.7502 13 14.4102 13 14.0002C13 13.5902 13.34 13.2502 13.75 13.2502H17.25C17.66 13.2502 18 13.5902 18 14.0002C18 14.4102 17.66 14.7502 17.25 14.7502Z"
  />
</template>
