<template>
  <path
    d="M18.5 11.5002C19.42 11.5002 20.25 11.7602 20.99 12.1902V5.00024C20.99 3.90024 20.1 3.00024 19 3.00024H5C3.9 3.00024 3 3.90024 3 5.00024V15.0002C3 16.1002 3.9 17.0002 5 17.0002H13.55C13.53 16.8302 13.5 16.6702 13.5 16.5002C13.5 13.7402 15.74 11.5002 18.5 11.5002ZM12.89 10.0502C12.33 10.3302 11.66 10.3302 11.1 10.0502L5.49 7.25024C5.19 7.10024 5 6.79024 5 6.45024C5 5.79024 5.7 5.35024 6.29 5.65024L12 8.50024L17.71 5.65024C18.3 5.35024 19 5.78024 19 6.45024C19 6.79024 18.81 7.10024 18.51 7.25024L12.89 10.0502ZM18.5 13.0002C16.57 13.0002 15 14.5702 15 16.5002C15 18.4302 16.57 20.0002 18.5 20.0002C20.43 20.0002 22 18.4302 22 16.5002C22 14.5702 20.43 13.0002 18.5 13.0002ZM20.5 16.5002C20.5 16.7802 20.28 17.0002 20 17.0002H17C16.72 17.0002 16.5 16.7802 16.5 16.5002C16.5 16.2202 16.72 16.0002 17 16.0002H20C20.28 16.0002 20.5 16.2202 20.5 16.5002Z"
  />
</template>
