<template>
  <path
    d="M7.75999 7.83024L7.77999 7.85024C8.12999 8.20024 8.66999 8.23024 9.07999 7.94024C9.90999 7.37024 10.92 7.02024 12 7.02024C13.08 7.02024 14.09 7.37024 14.92 7.95024C15.32 8.24024 15.87 8.21024 16.22 7.86024L16.24 7.84024C16.66 7.42024 16.63 6.70024 16.15 6.35024C14.98 5.50024 13.55 5.00024 12 5.00024C10.45 5.00024 9.01999 5.50024 7.85999 6.34024C7.36999 6.69024 7.33999 7.41024 7.75999 7.83024ZM12 1.00024C9.37999 1.00024 6.96999 1.93024 5.07999 3.47024C4.61999 3.84024 4.56999 4.53024 4.99999 4.96024C5.35999 5.32024 5.92999 5.35024 6.31999 5.03024C7.85999 3.76024 9.84999 3.00024 12 3.00024C14.15 3.00024 16.14 3.76024 17.69 5.03024C18.08 5.35024 18.65 5.32024 19.01 4.96024C19.43 4.54024 19.39 3.85024 18.93 3.47024C17.03 1.93024 14.62 1.00024 12 1.00024ZM14.86 10.0102L9.14 10.0002C8.50999 10.0002 7.99999 10.5102 7.99999 11.1402V20.8502C7.99999 21.4802 8.50999 21.9902 9.14 21.9902H14.85C15.48 21.9902 15.99 21.4802 15.99 20.8502V11.1402C16 10.5102 15.49 10.0102 14.86 10.0102ZM15 20.0002H8.99999V12.0002H15V20.0002Z"
  />
</template>
