<template>
  <path
    d="M11.98 7.00024H12.01C12.56 7.00024 13 6.56024 13 6.02024V2.98024C13 2.44024 12.56 2.00024 12.02 2.00024H11.99C11.44 2.00024 11 2.44024 11 2.98024V6.01024C11 6.56024 11.44 7.00024 11.98 7.00024ZM16.9 9.11024C17.29 9.50024 17.91 9.50024 18.3 9.11024C18.92 8.48024 19.82 7.57024 20.45 6.94024C20.84 6.56024 20.84 5.93024 20.45 5.55024C20.07 5.17024 19.44 5.17024 19.06 5.55024L16.89 7.70024C16.5 8.08024 16.5 8.71024 16.89 9.09024L16.9 9.11024ZM5.71003 9.10024C6.09003 9.49024 6.72003 9.49024 7.11003 9.10024C7.49003 8.72024 7.49003 8.09024 7.11003 7.71024L4.96003 5.54024C4.58003 5.15024 3.95003 5.15024 3.57003 5.54024L3.55003 5.55024C3.16003 5.94024 3.16003 6.56024 3.55003 6.94024C4.18003 7.56024 5.09003 8.47024 5.71003 9.10024ZM23.29 16.2302C16.88 10.5702 7.22003 10.5702 0.81003 16.2302C-0.0399702 16.9802 -0.0399702 18.3102 0.76003 19.1102L1.98003 20.3302C2.70003 21.0502 3.84003 21.1102 4.64003 20.4802L6.64003 18.8902C7.12003 18.5102 7.40003 17.9302 7.40003 17.3202V14.7202C10.42 13.7402 13.69 13.7302 16.72 14.7202V17.3302C16.72 17.9402 17 18.5202 17.48 18.9002L19.47 20.4802C20.27 21.1102 21.41 21.0502 22.13 20.3302L23.35 19.1102C24.14 18.3102 24.14 16.9802 23.29 16.2302Z"
  />
</template>
