<template>
  <path
    d="M2.71 3.07024C2.32 3.46024 2.32 4.09024 2.71 4.48024L4.1 5.87024C2.79 7.57024 2 9.69024 2 12.0002C2 15.3002 3.6 18.2202 6.06 20.0402C6.54 20.3902 7.22 20.2502 7.52 19.7302C7.77 19.3002 7.66 18.7402 7.26 18.4402C5.29 16.9802 4 14.6502 4 12.0002C4 10.2402 4.57 8.62024 5.53 7.31024L6.96 8.75024C6.36 9.68024 6 10.8002 6 12.0002C6 13.8002 6.8 15.4102 8.06 16.5102C8.52 16.9102 9.25 16.7602 9.56 16.2302L9.57 16.2202C9.81 15.8002 9.7 15.2802 9.34 14.9602C8.52 14.2302 8 13.1802 8 12.0002C8 11.3502 8.17 10.7502 8.44 10.2102L10.02 11.7902L10 12.0002C10 13.1002 10.9 14.0002 12 14.0002L12.21 13.9802L19.02 20.7902C19.41 21.1802 20.04 21.1802 20.43 20.7902C20.82 20.4002 20.82 19.7702 20.43 19.3802L4.13 3.07024C3.74 2.68024 3.1 2.68024 2.71 3.07024ZM17.71 13.8202C17.89 13.2502 18 12.6302 18 12.0002C18 8.69024 15.31 6.00024 12 6.00024C11.37 6.00024 10.75 6.11024 10.18 6.29024L11.9 8.01024C11.93 8.01024 11.96 8.00024 12 8.00024C14.21 8.00024 16 9.79024 16 12.0002C16 12.0402 15.99 12.0702 15.99 12.1102L17.71 13.8202ZM12 4.00024C16.42 4.00024 20 7.58024 20 12.0002C20 13.2002 19.71 14.3202 19.23 15.3502L20.72 16.8402C21.53 15.4002 22 13.7602 22 12.0002C22 6.48024 17.52 2.00024 12 2.00024C10.24 2.00024 8.6 2.48024 7.16 3.28024L8.64 4.76024C9.66 4.28024 10.8 4.00024 12 4.00024Z"
  />
</template>
