<template>
  <path
    d="M14.54 17.3703C11.91 19.4503 8.65 20.7603 5.09 20.9803C3.96 21.0503 3.02 20.1103 3.02 18.9803V17.2503C3.01 16.2403 3.77 15.3903 4.78 15.2703L7.32 14.9803C7.93 14.9103 8.53 15.1203 8.96 15.5503L10.8 17.3903C11.61 16.9803 12.39 16.4903 13.11 15.9403L2.1 4.93026C1.71 4.54026 1.71 3.91026 2.1 3.52026C2.49 3.13026 3.13 3.13026 3.52 3.52026L20.49 20.5003C20.88 20.8903 20.88 21.5203 20.49 21.9103C20.1 22.3003 19.47 22.3003 19.08 21.9103L14.54 17.3703ZM17.39 10.8003L15.54 8.95026C15.11 8.52026 14.9 7.92026 14.97 7.31026L15.26 4.79026C15.38 3.78026 16.23 3.02026 17.25 3.02026H18.98C20.11 3.02026 21.05 3.96026 20.98 5.09026C20.76 8.66026 19.44 11.9203 17.36 14.5603L15.93 13.1303C16.48 12.4003 16.97 11.6203 17.39 10.8003Z"
  />
</template>
