<template>
  <path
    d="M18.05 21.2902C17.66 21.6802 17.03 21.6802 16.64 21.2902L14.52 19.1702C14.13 18.7802 14.13 18.1502 14.52 17.7602C14.91 17.3702 15.54 17.3702 15.93 17.7602L17.34 19.1702L20.88 15.6302C21.27 15.2402 21.9 15.2402 22.29 15.6302C22.68 16.0202 22.68 16.6502 22.29 17.0402L18.05 21.2902ZM12.08 20.0002H4C2.9 20.0002 2 19.1002 2 18.0002V6.00024C2 4.90024 2.9 4.00024 4 4.00024H20C21.1 4.00024 22 4.90024 22 6.00024V12.6802C21.09 12.2502 20.08 12.0002 19 12.0002C15.13 12.0002 12 15.1302 12 19.0002C12 19.3402 12.03 19.6702 12.08 20.0002ZM11.47 12.6702C11.79 12.8702 12.21 12.8702 12.53 12.6702L19.6 8.25024C19.85 8.09024 20 7.82024 20 7.53024C20 6.86024 19.27 6.46024 18.7 6.81024L12 11.0002L5.3 6.81024C4.73 6.46024 4 6.86024 4 7.53024C4 7.82024 4.15 8.09024 4.4 8.25024L11.47 12.6702Z"
  />
</template>
