<template>
  <path
    d="M17.5 4.50024C15.55 4.50024 13.45 4.90024 12 6.00024C10.55 4.90024 8.45 4.50024 6.5 4.50024C5.05 4.50024 3.51 4.72024 2.22 5.29024C1.49 5.62024 1 6.33024 1 7.14024V18.4202C1 19.7202 2.22 20.6802 3.48 20.3602C4.46 20.1102 5.5 20.0002 6.5 20.0002C8.06 20.0002 9.72 20.2602 11.06 20.9202C11.66 21.2202 12.34 21.2202 12.93 20.9202C14.27 20.2502 15.93 20.0002 17.49 20.0002C18.49 20.0002 19.53 20.1102 20.51 20.3602C21.77 20.6902 22.99 19.7302 22.99 18.4202V7.14024C22.99 6.33024 22.5 5.62024 21.77 5.29024C20.49 4.72024 18.95 4.50024 17.5 4.50024ZM21 17.2302C21 17.8602 20.42 18.3202 19.8 18.2102C19.05 18.0702 18.27 18.0102 17.5 18.0102C15.8 18.0102 13.35 18.6602 12 19.5102V8.00024C13.35 7.15024 15.8 6.50024 17.5 6.50024C18.42 6.50024 19.33 6.59024 20.2 6.78024C20.66 6.88024 21 7.29024 21 7.76024V17.2302Z"
  />
</template>
