<template>
  <path
    d="M8 2.00024C6.9 2.00024 6 2.90024 6 4.00024L6.01 7.18024C6.01 7.71024 6.22 8.21024 6.59 8.59024L10 12.0002L6.59 15.4302C6.22 15.8002 6.01 16.3102 6.01 16.8402L6 20.0002C6 21.1002 6.9 22.0002 8 22.0002H16C17.1 22.0002 18 21.1002 18 20.0002V16.8402C18 16.3102 17.79 15.8002 17.42 15.4302L14 12.0002L17.41 8.60024C17.79 8.22024 18 7.71024 18 7.18024V4.00024C18 2.90024 17.1 2.00024 16 2.00024H8ZM16 16.9102V19.0002C16 19.5502 15.55 20.0002 15 20.0002H9C8.45 20.0002 8 19.5502 8 19.0002V16.9102C8 16.6402 8.11 16.3902 8.29 16.2002L12 12.5002L15.71 16.2102C15.89 16.3902 16 16.6502 16 16.9102Z"
  />
</template>
