<template>
  <path
    d="M16 22.0002C17.1 22.0002 18 21.1002 18 20.0002L17.99 16.8202C17.99 16.2902 17.78 15.7902 17.41 15.4102L14 12.0002L17.41 8.57024C17.78 8.20024 17.99 7.69024 17.99 7.16024L18 4.00024C18 2.90024 17.1 2.00024 16 2.00024H8C6.9 2.00024 6 2.90024 6 4.00024V7.16024C6 7.69024 6.21 8.20024 6.58 8.58024L10 12.0002L6.59 15.4002C6.21 15.7802 6 16.2902 6 16.8202V20.0002C6 21.1002 6.9 22.0002 8 22.0002H16ZM8 7.09024V5.00024C8 4.45024 8.45 4.00024 9 4.00024H15C15.55 4.00024 16 4.45024 16 5.00024V7.09024C16 7.36024 15.89 7.61024 15.71 7.80024L12 11.5002L8.29 7.79024C8.11 7.61024 8 7.35024 8 7.09024Z"
  />
</template>
